Achille Castiglioni Dry Flatware Set – Set of 5

Elevate your dining experience with the timeless elegance of the 5-Piece Achille Castiglioni Flatware Set. Crafted with meticulous attention to detail, this set exudes sophistication with its sleek and minimalist design. Made of 18/10 stainless steel that’s mirror polished with a matte handle, each piece is not only a pleasure to hold but also a stunning addition to any table setting. The Achille Castiglioni Flatware Set includes a Tablespoon, Dinner Fork, Knife, Teaspoon, and Dessert Fork. Hand-wash only. Measures: 7.5″l (Tablespoon), 7.5″l (Dinner Fork), 9″l (Knife), 5.75″l (Teaspoon), and 5.85″l (Dessert Fork). Achille Castiglioni’s designs are represented in MoMA’s collection.

The post Achille Castiglioni Dry Flatware Set – Set of 5 first appeared on UFitnessEssentials.